.-
help for ^feldti^
by Herve M. CACI, September 1999 (v1.0)
.-

Comparison of two independent coefficients of reliability
---------------------------------------------------------

     ^feldti^ rel1 rel2, N1() n2() K1() k2()

Description
-----------

The reliabilities of two tests (^rel1^ & ^rel2^) are compared between
two samples of ^n1^ & ^n2^ subjects. The tests are ^k1^ and ^k2^ items
long respectively.
The independence of the samples is assumed.

If ^n2^ is not specified, the samples are supposed to be of equal sizes.
If ^k2^ is not specified, the tests are supposed to be of equal lengths.

Reference
---------

Feldt L.S. "A test of the hypothesis that Cronbach's alpha or Kuder-
Richardson coefficient twenty is the same for two tests", Psychometrika,
1969, 34(3), pp363-373.

Also see
--------

    STB:  ^alpha2^ in sg66 (STB-35)
 Manual:  ^[R] alpha^
On-line:  help for @factor@
