{smcl}
{* 18sep2002}{...}
{.-}
help for {cmd: mici warning *}
{.-}

{title:Warning message from mici}

{p 8} 
Number of observations differs across datasets.


{title:Explanation}

{p}
The number of observations is different across the multiple datasets. 
This is probably because {cmd:if} was specified in {help mici}. 

{p}
You can see results from each of the multiple datasets
by using the {cmd:indiv} option in {help mici}.
