{smcl}
{* 18sep2002}{...}
{.-}
help for {cmd: mici warning **}
{.-}

{title:Warning message from executing mici}

{p}No variation between datasets.


{title:Explanation}

{p}
The estimates are the same across the multiple datasets, i.e. there was no
between-imputation variation. The common result has been displayed.
