.-
help for ^svytabform^
.-

Create tables of means, standard deviations and confidence intervals for servey data
-----------------------------------

^svytabform^ varlist using filename [if] [in] [aw fw], [ by(varname) sd se ci level(#) ^not^otal bdec(#) 
							 ^sdb^racket ^cib^race ^mt^est ^mtp^rob ^mts^e ^mtb^dec ^ver^tical ]

Description
-----------------------------------
^svytabform^ requires that the survey-designed variables be identified using svyset

^svytabform^ creates tables of means, standard deviations, and confidence intervals corrected by probability weights 
and put them in the following format:

	| 	Item1	| 	Item2	| 	Item3	| 	Item4	| 	....	
--------|---------------|---------------|---------------|---------------|---------------
	       mean		mean		mean		mean		mean
	       (sd)		(sd)		(sd)		(sd)		(sd)
	     [lb;ub]	      [lb;ub]	      [lb;ub]	      [lb;ub]	       [lb;ub]
--------|---------------|---------------|---------------|---------------|---------------


Options		Description
-----------------------------------
^sd^ 		reports standard deviations
^se^		reports standard errors of means. Either ^sd^ or ^se^ can be specified
^ci^ 		reports confidence intervals
^level^ 	specifies the level of significance for the confidence intervals; The default is 95%
^nototal^ 	specifies not to report overall statistics when using with by()
^bdec^ 		specifies the number of digits after the decimal for the standard deviations and the confidence intervals.
^sdbracket^	puts standard deviations (or standard errors of means) in [] rather than ()
^cibrace^	puts confidence intervals in {} rather than []
^mtest^		performs t tests on the equality of means (of the current category and the rest). 
	By default, the level of significance is indicated by stars 
	(* significant at 10%; ** significant at 5%; *** significant at 1%).
^mtprob^	p-values of the test statistic are included instead of stars.
^mtse^ 		SEs of the test statistic are included instead of stars.
	Either ^mtprob^ or ^mtse^ can be speficied.
^mtbdec^ 	specifies the number of digits after the decimal for the p-values and the SEs of the mean-difference test.
^vertical^	presents variables in the table vertically (the default is horizontally).

Remark
-------
If neither ^sd^ nor ^ci^ is specified, the command report means


Examples
-------

    ^. svytabform item1 item2 item3 using Test.xls, sd^
    ^. svytabform item1 item2 item3 using Test.xls, by(month) sd ci level(90) bdec(2) nototal sdbracket cibrace^


Author
-------
		Le Dang Trung
		ld.trung@yahoo.co.uk
